<template>

  <div class="table-main">
    <el-table :data="tableData" height="335px" :header-cell-style="{ textAlign: 'center' } "
              :cell-style="{ textAlign: 'center' }">
<!--      <el-table-column prop="chnNum" label="通道号" width="80">-->
<!--        <template #default="{row}">-->
<!--          {{ '通道' + row.chnNum }}-->
<!--        </template>-->
<!--      </el-table-column>-->
      <template v-if="phaseFlag === 0">
        <el-table-column :label="`A（${unit}）`">
          <el-table-column prop="standardValue" width="74" label="标准值（V）"/>
          <el-table-column prop="A" width="74" label="被检值">

          </el-table-column>
          <el-table-column prop="A_errValue" width="74" label="误差值">

          </el-table-column>
        </el-table-column>
        <el-table-column :label="`B（${unit}）`">
          <el-table-column prop="standardValue" width="74" label="标准值（V）"/>
          <el-table-column prop="B" width="74" label="被检值">

          </el-table-column>
          <el-table-column prop="B_errValue" width="74" label="误差值">

          </el-table-column>
        </el-table-column>
        <el-table-column :label="`C（${unit}）`">
          <el-table-column prop="standardValue" width="74" label="标准值（V）"/>
          <el-table-column prop="C" width="74" label="被检值">

          </el-table-column>
          <el-table-column prop="C_errValue" width="74" label="误差值">

          </el-table-column>
        </el-table-column>
        <el-table-column prop="maxErrVaule" label="最大误差（V）">

        </el-table-column>
        <el-table-column prop="result" label="检测结果" width="70">
          <template #default="scope">
            <el-tag type="danger" v-if="scope.row.result === '不合格'">{{ scope.row.result }}</el-tag>
            <span v-if="scope.row.result != '不合格'">{{ scope.row.result }}</span>
          </template>
        </el-table-column>
      </template>
      <template v-if="phaseFlag === 1">
        <el-table-column :label="`T（${unit}）`">
          <el-table-column prop="standardValue" label="标准值（V）"/>
          <el-table-column prop="T" label="被检值">

          </el-table-column>
          <el-table-column prop="T_errValue" label="误差值">

          </el-table-column>
        </el-table-column>
        <el-table-column prop="maxErrVaule" label="最大误差（V）">

        </el-table-column>
        <el-table-column prop="result" label="检测结果">
          <template #default="scope">
            <el-tag type="danger" v-if="scope.row.result === '不合格'">{{ scope.row.result }}</el-tag>
            <span v-if="scope.row.result != '不合格'">{{ scope.row.result }}</span>
          </template>
        </el-table-column>
      </template>

    </el-table>

  </div>

</template>

<script lang="tsx" setup>
import {defineProps} from 'vue';
import {CheckData} from "@/api/check/interface";

const {tableData} = defineProps<{
  tableData: CheckData.CheckResult[],
}>();

const unit = computed(() => {
  return "V"
})

const phaseFlag = computed(() => {
  let result = 0;
  if (tableData.length > 0) {
    result = !tableData[0].T ? 0:1;
  }
  return result;
})

</script>

<style scoped>

.form-grid {
  display: flex;
  flex-direction: row; /* 横向排列 */
  flex-wrap: wrap; /* 允许换行 */
}

.form-grid .el-form-item {
  flex: 1 1 30%; /* 控件宽度 */
  margin-right: 20px; /* 控件间距 */
}

.form-grid .el-form-item:last-child {
  margin-right: 0; /* 最后一个控件不需要右边距 */
}

.dialog-footer {
  display: flex;
  justify-content: flex-start;
  margin-bottom: 10px; /* 调整这里的值以增加或减少间距 */
}

.el-tabs {
  margin-bottom: 20px; /* 添加底部边距 */
}

.el-table th, .el-table td {
  text-align: center; /* 所有单元格文字居中 */
}

</style>